DROP TABLE IF EXISTS `comment`;
SET character_set_client = utf8mb4 ;
CREATE TABLE `comment` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `user_id` int(11) DEFAULT NULL,
  `entity_type` int(11) DEFAULT NULL,
  `entity_id` int(11) DEFAULT NULL,
  `target_id` int(11) DEFAULT NULL,
  `content` text,
  `status` int(11) DEFAULT NULL,
  `create_time` timestamp NULL DEFAULT NULL,
  PRIMARY KEY (`id`),
  KEY `index_user_id` (`user_id`),
  KEY `index_entity_id` (`entity_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8;